;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;
; RDOS operating system
; Copyright (C) 1988-2000, Leif Ekblad
;
; This program is free software; you can redistribute it and/or modify
; it under the terms of the GNU General Public License as published by
; the Free Software Foundation; either version 2 of the License, or
; (at your option) any later version. The only exception to this rule
; is for commercial usage in embedded systems. For information on
; usage in commercial embedded systems, contact embedded@rdos.net
;
; This program is distributed in the hope that it will be useful,
; but WITHOUT ANY WARRANTY; without even the implied warranty of
; MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
; GNU General Public License for more details.
;
; You should have received a copy of the GNU General Public License
; along with this program; if not, write to the Free Software
; Foundation, Inc., 59 Temple Place, Suite 330, Boston, MA  02111-1307  USA
;
; The author of this program may be contacted at leif@rdos.net
;
; STATE.INC
; Common types for thread state
;
;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;

state_ep    STRUC
sep_offs    DQ ?
sep_sel     DW ?
state_ep    ENDS

state_struc	STRUC
st_id		DW ?
st_name		DB 32 DUP(?)
st_time		DD ?,?
st_list		DB 32 DUP(?)
st_offs 	DD ?
st_sel		DW ?
state_struc	ENDS

action_state_struc	STRUC
ast_id		DW ?
ast_name	DB 32 DUP(?)
ast_time	DD ?,?
ast_list	DB 32 DUP(?)
ast_action  DB 32 DUP(?)
ast_pos 	state_ep <>
ast_count   DW ?
ast_user    DB 64 * SIZE state_ep DUP(?)

action_state_struc	ENDS
