;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;
; RDOS operating system
; Copyright (C) 1988-2000, Leif Ekblad
;
; This program is free software; you can redistribute it and/or modify
; it under the terms of the GNU General Public License as published by
; the Free Software Foundation; either version 2 of the License, or
; (at your option) any later version. The only exception to this rule
; is for commercial usage in embedded systems. For information on
; usage in commercial embedded systems, contact embedded@rdos.net
;
; This program is distributed in the hope that it will be useful,
; but WITHOUT ANY WARRANTY; without even the implied warranty of
; MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
; GNU General Public License for more details.
;
; You should have received a copy of the GNU General Public License
; along with this program; if not, write to the Free Software
; Foundation, Inc., 59 Temple Place, Suite 330, Boston, MA  02111-1307  USA
;
; The author of this program may be contacted at leif@rdos.net
;
; INT.DEF
; Common software interrupt related types
;
;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;

int_seg	SEGMENT AT 0

vm_int_handlers		DW 100h DUP(?,?)

pm16_int_handlers	DW 100h DUP(?,?)
pm32_int_handlers	DW 100h DUP(?,?)

get_vm_int_handlers	DW 100h DUP(?,?)
set_vm_int_handlers	DW 100h DUP(?,?)

get_pm16_int_handlers	DW 100h DUP(?,?)
set_pm16_int_handlers	DW 100h DUP(?,?)

get_pm32_int_handlers	DW 100h DUP(?,?)
set_pm32_int_handlers	DW 100h DUP(?,?)

vm_reflect_ads		DD ?
vm_reflect_seg		DW ?

pm_reflect_ads		DD ?
pm_reflect_seg		DW ?

sim_int16_offs		DW ?
sim_int16_seg		DW ?

sim_int32_offs		DW ?
sim_int32_seg		DW ?

pm_to_vm_done_ads	DD ?
pm_to_vm_done_seg	DW ?

call_vm_ret_seg		DW ?
call_pm16_ret_sel	DW ?

v86_raw_offs		DW ?
v86_raw_seg			DW ?

int_seg_size		DB ?

int_seg	ENDS

pint_seg	SEGMENT AT 0

pint_locked_stack	DW ?
pint_prot16_stack	DW ?
pint_real_stack		DD ?

pint_seg_size		DB ?

pint_seg	ENDS

vm_call_struc	STRUC

vcs_edi		DD ?
vcs_esi		DD ?
vcs_ebp		DD ?
vcs_res		DD ?
vcs_ebx		DD ?
vcs_edx		DD ?
vcs_ecx		DD ?
vcs_eax		DD ?
vcs_flags	DW ?
vcs_es		DW ?
vcs_ds		DW ?
vcs_fs		DW ?
vcs_gs		DW ?
vcs_ip		DW ?
vcs_cs		DW ?
vcs_sp		DW ?
vcs_ss		DW ?

vm_call_struc	ENDS


